From 5b47b89d16fe2cef7654dba1edaa5043196c9e14 Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Mon, 16 Aug 2010 09:43:48 +0000
Subject: First step of completing the target rename in the manual. Some target
 specific options were already renamed in the rest of the source (e.g. see
 r23883) but not where they are actually set - in the platform files - leading
 to parts included or excluded incorrectly. The problem exists for more
 targets, this commit deals with the supported Iaudios first. Rename 'x5' to
 'iaudiox5' (do the same for 'm5' and 'm3'), fix small errors or add missing
 info related to them along the way, use more appropriate options and simplify
 code a bit where possible.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@27823 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/iaudiom3.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/platform/iaudiom3.tex')

diff --git a/manual/platform/iaudiom3.tex b/manual/platform/iaudiom3.tex
index b9beafaa84..cf5c347a59 100644
--- a/manual/platform/iaudiom3.tex
+++ b/manual/platform/iaudiom3.tex
@@ -1,5 +1,5 @@
 % $Id$ %
-\def\UseOption{m3}
+\def\UseOption{iaudiom3}
 \edef\UseOption{\UseOption,HAVE_RB_BL_IN_FLASH}
 \edef\UseOption{\UseOption,IAUDIO_M3_PAD}
 \edef\UseOption{\UseOption,IAUDIO_RC_PAD}
-- 
cgit v1.2.3

