From 94a372524ae8b56349c8eeccf5431fbd6742a78d Mon Sep 17 00:00:00 2001
From: Christi Scarborough <christi@coraline.org>
Date: Sat, 19 May 2007 19:21:52 +0000
Subject: Add a macro for the Hold button on non-Archos targets.  Link to blind
 FAQ at the top of the physical descriptions of the units.  Add description
 for the Gigabeat F.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@13422 a1c6a512-1295-4272-9138-f99709370657
---
 manual/platform/gigabeatf.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/platform/gigabeatf.tex')

diff --git a/manual/platform/gigabeatf.tex b/manual/platform/gigabeatf.tex
index f62e187006..ba03fbc844 100644
--- a/manual/platform/gigabeatf.tex
+++ b/manual/platform/gigabeatf.tex
@@ -30,7 +30,7 @@
 \newcommand{\ButtonVolDown}{\btnfnt{Volume down}}
 \newcommand{\ButtonSelect}{\btnfnt{Select}}
 \newcommand{\ButtonA}{\btnfnt{A}}
-
+\newcommand{\ButtonHold}{\btnfnt{Hold}}
 
 %Button actions, standard context
 \newcommand{\ActionStdPrev}{\ButtonUp}
-- 
cgit v1.2.3

