From 8cb555460ff79e636a7907fb2589e16db98c8600 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Fri, 17 Jul 2020 00:01:32 -0400
Subject: [3/4]  Completely remove HWCODEC support

'swcodec' is now always set (and recording_swcodec for recording-capable
units) in feature.txt so the manual and language strings don't need to
all be fixed up.

Change-Id: Ib2c9d5d157af8d33653e2d4b4a12881b9aa6ddb0
---
 manual/main_menu/recording_screen.tex | 1 -
 1 file changed, 1 deletion(-)

(limited to 'manual/main_menu/recording_screen.tex')

diff --git a/manual/main_menu/recording_screen.tex b/manual/main_menu/recording_screen.tex
index a3c8ca006c..0d1de44c83 100644
--- a/manual/main_menu/recording_screen.tex
+++ b/manual/main_menu/recording_screen.tex
@@ -22,7 +22,6 @@ recording.\\*
 the peak meters to freeze in the process. This is expected behaviour, and
 nothing to worry about. The recording continues during the spin up.\\*}}}
 
-\opt{recording_hwcodec}{The frequency, channels and quality}
 \opt{recording_swcodec}{The frequency and channels} settings are shown in the
 status bar.\\*
 
-- 
cgit v1.2.3

