From 4e1b7bf7286c3994e34ca11f740a2165d9b5a001 Mon Sep 17 00:00:00 2001
From: Robert Menes <rmenes@rockbox.org>
Date: Mon, 26 Jan 2009 12:04:48 +0000
Subject: Commit FS#9825 and FS#9826 by Alex Parker: Correct the recording
 table button for the c200 and don't show hard disk spin up warning for
 flash+SWCODEC (FS#9825) and Correct incorrect splash on c200 (FS#9826).

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@19859 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording_screen.tex | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'manual/main_menu/recording_screen.tex')

diff --git a/manual/main_menu/recording_screen.tex b/manual/main_menu/recording_screen.tex
index 05aa73ee71..a24b67f0e1 100644
--- a/manual/main_menu/recording_screen.tex
+++ b/manual/main_menu/recording_screen.tex
@@ -15,10 +15,13 @@ affect the recorded sound. If enabled in the peak meter settings, a counter in
 front of the peak meters shows the number of times the clip indicator was
 activated during recording. The counter is reset to zero when starting a new
 recording.
+
 \opt{swcodec}{
+\opt{disk_storage}{
 \note{When you start a recording, the hard disk will spin up. This will cause
 the peak meters to freeze in the process. This is expected behaviour, and
-nothing to worry about. The recording continues during the spin up.}}
+nothing to worry about. The recording continues during the spin up.}}}
+
 \opt{MASCODEC}{The frequency, channels and quality}
 \opt{swcodec}{The frequency and channels} settings are shown on the last line.
 
@@ -38,7 +41,7 @@ The controls for this screen are:
                     & While recording: Stop recording.\\
     %
     \opt{IRIVER_H10_PAD,IRIVER_H100_PAD,IRIVER_H300_PAD,IAUDIO_X5_PAD,%
-         SANSA_E200_PAD,IPOD_4G_PAD}{
+         SANSA_E200_PAD,IPOD_4G_PAD,SANSA_C200_PAD}{
       \ActionRecNewfile & Starts recording.\\
                         & While recording: close the current file and open
                           a new one.\\
-- 
cgit v1.2.3

