From 35ae21017e10a8ffd90f9e0e8def021fb724e9bb Mon Sep 17 00:00:00 2001
From: Michael Chicoine <mc2739@gmail.com>
Date: Fri, 27 Nov 2009 15:20:52 +0000
Subject: Fix FS#10817 - Wrong layout of the keymap table for the 'While
 Recording Screen'

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@23772 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording_screen.tex | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'manual/main_menu/recording_screen.tex')

diff --git a/manual/main_menu/recording_screen.tex b/manual/main_menu/recording_screen.tex
index 01a01de59b..5d661a28a0 100644
--- a/manual/main_menu/recording_screen.tex
+++ b/manual/main_menu/recording_screen.tex
@@ -41,7 +41,8 @@ The controls for this screen are:
     \ActionRecPause 
     \opt{HAVEREMOTEKEYMAP}{& \ActionRCRecPause}
                      & Start Recording.\\
-                     & While recording: pause recording (press again to
+                     & \opt{HAVEREMOTEKEYMAP}{&}
+                      While recording: pause recording (press again to
                       continue).\\
     %
     \ActionRecExit  
@@ -55,7 +56,7 @@ The controls for this screen are:
       \ActionRecNewfile
       \opt{HAVEREMOTEKEYMAP}{& \ActionRCRecNewfile} 
                      & Start Recording.\\
-                    & \opt{HAVEREMOTEKEYMAP}{&}
+                     & \opt{HAVEREMOTEKEYMAP}{&}
                         While recording: close the current file and open
                         a new one.\\
     }
-- 
cgit v1.2.3

