From 12eb058bb065e9cb85949ec3a66c453ac5e1b883 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sun, 23 Mar 2008 22:07:09 +0000
Subject: Make more use of the 'features' system in the manuals (committed in
 r16304), less stuff to keep in sync manually but keep in mind that changes in
 config-*.h can now affect the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16765 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording_screen.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/main_menu/recording_screen.tex')

diff --git a/manual/main_menu/recording_screen.tex b/manual/main_menu/recording_screen.tex
index 2e6daa556e..55a3325655 100644
--- a/manual/main_menu/recording_screen.tex
+++ b/manual/main_menu/recording_screen.tex
@@ -15,12 +15,12 @@ affect the recorded sound. If enabled in the peak meter settings, a counter in
 front of the peak meters shows the number of times the clip indicator was
 activated during recording. The counter is reset to zero when starting a new
 recording.
-\opt{SWCODEC}{
+\opt{swcodec}{
 \note{When you start a recording, the hard disk will spin up. This will cause
 the peak meters to freeze in the process. This is expected behaviour, and
 nothing to worry about. The recording continues during the spin up.}}
 \opt{MASCODEC}{The frequency, channels and quality}
-\opt{SWCODEC}{The frequency and channels} settings are shown on the last line.
+\opt{swcodec}{The frequency and channels} settings are shown on the last line.
 
 The controls for this screen are:
 \begin{table}
-- 
cgit v1.2.3

