From dbf98172b9140adb846aab9650a4f08deab7d29d Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Thu, 24 Aug 2006 11:18:57 +0000
Subject: fix typo and update the 160x128x2 screenshot

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10733 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/main_menu/recording.tex')

diff --git a/manual/main_menu/recording.tex b/manual/main_menu/recording.tex
index b70fde3aeb..bc8564e1df 100644
--- a/manual/main_menu/recording.tex
+++ b/manual/main_menu/recording.tex
@@ -5,7 +5,7 @@
   screen}{}
 
 Entering the \setting{Recording} option in the \setting{Main Menu} brings up
-a screen in wich you can choose to enter the \setting{Recording Screen} or
+a screen in which you can choose to enter the \setting{Recording Screen} or
 the \setting{Recording Settings} (see below). The \setting{Recording Screen}
 shows the time elapsed and the size of the file being recorded. A peak meter
 is present to allow you set Gain correctly. There is also a volume setting,
-- 
cgit v1.2.3

