From 9ed3dca77920b34c26dce517cc6758d973c6eea1 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Tue, 16 Jan 2007 20:27:34 +0000
Subject: Include AGC options in iriver h100 and h300 manuals only as it is
 only supported on those targets

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@12028 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/main_menu/recording.tex')

diff --git a/manual/main_menu/recording.tex b/manual/main_menu/recording.tex
index b642759bfc..b810c9f168 100644
--- a/manual/main_menu/recording.tex
+++ b/manual/main_menu/recording.tex
@@ -190,7 +190,7 @@ The controls for this screen are:
   \item[Trigger:]
     \fixme{Add description of triggered recording.}
 
-\opt{SWCODEC}{%
+\opt{h1xx,h300}{%
   \item[Automatic Gain Control:]
     The \setting{Automatic Gain Control} has five different presets for
     automatically controlling the gain while recording.
-- 
cgit v1.2.3

