From 328a2073b054a66c8d4cabfaa4911bfaf27cb730 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Thu, 24 Aug 2006 11:00:56 +0000
Subject: Corrections to the last commit

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10732 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/recording.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/main_menu/recording.tex')

diff --git a/manual/main_menu/recording.tex b/manual/main_menu/recording.tex
index e98fcee0bd..b70fde3aeb 100644
--- a/manual/main_menu/recording.tex
+++ b/manual/main_menu/recording.tex
@@ -11,9 +11,10 @@ shows the time elapsed and the size of the file being recorded. A peak meter
 is present to allow you set Gain correctly. There is also a volume setting,
 this will only affect the output level of the \dap{} and does \emph{not}
 affect the recorded sound.
+\opt{SWCODEC}{
 \note{When you start a recording, the hard disk will spin up. This will cause
 the peak meters to freeze in the process. This is expected behaviour, and
-nothing to worry about. Recording is continiued during the spin up.}
+nothing to worry about. The recording continues during the spin up.}}
 \opt{MASCODEC}{The frequency, channels and quality}
 \opt{SWCODEC}{The frequency and channels} settings are shown on the last line.
 
-- 
cgit v1.2.3

