From f8d1f791be573eb557a015bcf3163a4ecee775a2 Mon Sep 17 00:00:00 2001
From: Christian Soffke <christian.soffke@gmail.com>
Date: Fri, 12 Aug 2022 17:45:36 +0200
Subject: manual: update quickscreen defaults

'Show Files' hasn't been a default
QuickScreen setting for a while

Change-Id: I9ed95897bef5c3b95d38e3ee5a7db3cb723cb17b
---
 manual/main_menu/main.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index 0f5a3d26c5..4aded9810b 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -247,9 +247,8 @@ utilities. A detailed description of the different plugins is to be found in
     available from the \setting{While Playing Screen} by default.
   }
   It allows rapid access to your four favourite settings.  The default settings are
-  \setting{Shuffle} (\reference{ref:PlaybackSettings}),
-  \setting{Repeat} (\reference{ref:PlaybackSettings}) and the
-  \setting{Show Files} (\reference{ref:ShowFiles}) options, but almost all
+  \setting{Shuffle} (\reference{ref:PlaybackSettings}) and
+  \setting{Repeat} (\reference{ref:PlaybackSettings}), but almost all
   configurable options in Rockbox can be placed on this screen.  To change the
   options, navigate through the menus to the setting you want to add and press
   \ActionStdContext.  In the menu which appears you will be given options
-- 
cgit v1.2.3

