From b02123d349cb7ec914633b4233d6838dfe5a9b46 Mon Sep 17 00:00:00 2001
From: Dana Conrad <dconrad@fastmail.com>
Date: Tue, 5 Apr 2022 21:59:37 -0500
Subject: Manual: Add Eros Q Native

Here is the PDF this patchset produces: https://www.dropbox.com/s/v1uz8p2fsgsz1ng/rockbox-erosqnative-923dabb5cd-220409.pdf?dl=0

Change-Id: I27554cb65a6498a6ccb714d4f93f25264b516e99
---
 manual/main_menu/main.tex | 16 ++++++++++++----
 1 file changed, 12 insertions(+), 4 deletions(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index bdb422e10a..f6f70b1084 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -238,9 +238,15 @@ utilities. A detailed description of the different plugins is to be found in
 \opt{quickscreen}
 {
 \section{\label{ref:QuickScreen}Quick Screen}
-  Although the \setting{Quick Screen} is accessible from nearly everywhere,
-  not just the \setting{Main Menu}, it is worth mentioning here.  It allows
-  rapid access to your four favourite settings.  The default settings are
+  \nopt{erosqnative}{
+    Although the \setting{Quick Screen} is accessible from nearly everywhere,
+    not just the \setting{Main Menu}, it is worth mentioning here.
+  }
+  \opt{erosqnative}{
+    On the \playertype{}, The \setting{Quick Screen} is only
+    available from the \setting{While Playing Screen} by default.
+  }
+  It allows rapid access to your four favourite settings.  The default settings are
   \setting{Shuffle} (\reference{ref:PlaybackSettings}),
   \setting{Repeat} (\reference{ref:PlaybackSettings}) and the
   \setting{Show Files} (\reference{ref:ShowFiles}) options, but almost all
@@ -249,7 +255,9 @@ utilities. A detailed description of the different plugins is to be found in
   \ActionStdContext.  In the menu which appears you will be given options
   to place the setting on the \setting{Quick Screen}.
   
-  Press \ActionStdQuickScreen{} to access it and \ActionQuickScreenExit{} to exit.
+  Press
+  \nopt{erosqnative}{\ActionStdQuickScreen{}}
+  \opt{erosqnative}{\ActionWpsQuickScreen{}} to access it and \ActionQuickScreenExit{} to exit.
   The direction buttons will modify the individual setting values as indicated 
   by the arrow icons. Please note that the settings at opposite sides of the
    screen cycle through the available options in opposite directions.
-- 
cgit v1.2.3

