From 4ea961ae3337cc75ecbe7f4fcc5c261c09541dbc Mon Sep 17 00:00:00 2001
From: Marc Guay <marcguay@rockbox.org>
Date: Sat, 3 Jan 2009 14:16:50 +0000
Subject: Fix links and spacing in Quick Screen section.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@19659 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index 77642ee61d..e9c2c62861 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -259,7 +259,7 @@ pages of information.}
   \ActionStdContext.  In the menu which appears you will be given options
   to place the setting on the Quick Screen. 
   
-  The \setting{Quick Screen} screen is accessed with \ActionStdQuickScreen
+  The \setting{Quick Screen} screen is accessed with \ActionStdQuickScreen 
   and exited with \ActionQuickScreenExit.  Use the direction buttons as indicated
   by the arrow icons to modify the individual setting values.
 }
-- 
cgit v1.2.3

