From 2fa5d81fcd66abd52cee622ba87787159d3cd2e7 Mon Sep 17 00:00:00 2001
From: Michael DiFebbo <medifebbo@rockbox.org>
Date: Thu, 3 Aug 2006 15:57:52 +0000
Subject: Fix broken reference.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10436 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index 3e3b268774..af4d5add96 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -87,7 +87,7 @@ and the way it plays music.  The details of this menu are covered in detail in
 The \setting{Manage Settings} option allows the saving and re-loading of user 
 configuration settings, browse the hard drive for alternate firmwares, and finally
 to reset your \dap\ back to initial configuration. The details of this menu are 
-covered in detail in \reference{ref:ManageSetting}.
+covered in detail in \reference{ref:manage_settings}.
 
 \section{Browse Themes}
 This option will display all the currently installed themes on the \dap, 
-- 
cgit v1.2.3

