From 2cf5abb971546df4ebaa2f132688eca44d520959 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Sun, 2 Apr 2006 17:29:44 +0000
Subject: another enhancement of \screenshot -- filenames should now not
 include the display size extension anymore. Old behaviour still supported.
 Minor code policing.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9432 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/main.tex | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index 64c2c0f49b..d42ed7bdcb 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -1,7 +1,7 @@
 \chapter{The Main Menu}
 
 \section{Introducing the Main Menu}
-\screenshot{main_menu/images/ss-main-menu-\genericimg.png}{The main menu}{}
+\screenshot{main_menu/images/ss-main-menu}{The main menu}{}
 This is the screen from which the rest of the Rockbox functions can be 
 accessed. It is used for a variety of functions, which are detailed below. 
 All options in Rockbox can be controlled via this menu.
@@ -60,7 +60,7 @@ settings may therefore not be saved unless the \dap\ is shut down safely
 }
 
 \section {Recent Bookmarks}
-\screenshot{main_menu/images/ss-list-bookmarks-\genericimg.png}%
+\screenshot{main_menu/images/ss-list-bookmarks}%
   {The list bookmarks screen}{}
 If the ``save a list of recently created bookmarks'' option is enabled 
 then you can view a list of several recent bookmarks here and select one to 
@@ -86,7 +86,7 @@ starting on page \pageref{ref:configure_rockbox_general}.
       
 \opt{CONFIG_TUNER}{
   \section{\label{ref:FMradio}FM Radio \opt{ondio}{ - OndioFM Only}}  
-  \screenshot{main_menu/images/ss-fm-radio-screen-\genericimg.png}%
+  \screenshot{main_menu/images/ss-fm-radio-screen}%
     {The FM radio screen}{}
   
   \opt{recorderv2fm,ondio}{
@@ -226,7 +226,7 @@ remember station frequency settings (presets).
 \opt{HAVE_RECORDING}{
   \section{\label{ref:Recording}Recording}
   \subsection{\label{ref:Whilerecordingscreen}While Recording Screen}
-  \screenshot{main_menu/images/ss-while-recording-screen-\genericimg.png}%
+  \screenshot{main_menu/images/ss-while-recording-screen}%
     {The while recording screen}{}
   Entering the ``Recording'' option in the Main menu launches the recording 
 application. The screen shows the time elapsed and the size of the file being 
@@ -278,7 +278,7 @@ recorded. A peak meter is present to allow you set Gain correctly.
   \end{table}
   
   \subsection{\label{ref:Recordingsettings}Recording Settings}
-  \screenshot{main_menu/images/ss-recording-settings-\genericimg.png}%
+  \screenshot{main_menu/images/ss-recording-settings}%
     {The recording settings screen}{}
   \opt{MASCODEC}{
     \begin{description}
-- 
cgit v1.2.3

