From 167a27dd76849c0ea8ed13d58297e334a9a90a1e Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Mon, 14 Jul 2008 20:40:28 +0000
Subject: Change wording of the main menu description

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@18042 a1c6a512-1295-4272-9138-f99709370657
---
 manual/main_menu/main.tex | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'manual/main_menu/main.tex')

diff --git a/manual/main_menu/main.tex b/manual/main_menu/main.tex
index 560d8947d2..43acd6af00 100644
--- a/manual/main_menu/main.tex
+++ b/manual/main_menu/main.tex
@@ -2,8 +2,9 @@
 \chapter{The Main Menu}
 \section{\label{ref:main_menu}Introducing the Main Menu}
 \screenshot{main_menu/images/ss-main-menu}{The main menu}{}
-The \setting{Main Menu} is the screen from which all of the Rockbox functions can be 
-accessed. To enter the \setting{Main Menu}, 
+The \setting{Main Menu} is the screen from which all of the Rockbox functions
+can be accessed. This is the first screen you will see when starting Rockbox.
+To return to the \setting{Main Menu}, 
   \nopt{ONDIO_PAD}{press the \ActionStdMenu{} button.}%
   \opt{ONDIO_PAD}{hold the \ButtonMenu{} button.}%
 
-- 
cgit v1.2.3

