From 72e9b610616f2969b100d501ab4f15ab5aecdd27 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Sat, 12 Dec 2020 23:08:16 -0500
Subject: manual:  Replace all rockbox.org urls with https.

In the process, utilize the \download{} and \wikilink{} commands instead
of direct URLs.

Change-Id: Iad38c15c7b9cec95b6c011fd0dbdbb3326985bbc
---
 manual/intro/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/intro/main.tex')

diff --git a/manual/intro/main.tex b/manual/intro/main.tex
index ef091e4550..fb794b9cce 100644
--- a/manual/intro/main.tex
+++ b/manual/intro/main.tex
@@ -28,7 +28,7 @@
 \vspace{1cm}
 \noindent
 \begin{center}
-\url{http://www.rockbox.org/}
+\url{https://www.rockbox.org/}
 
 \noindent
 Open Source Jukebox Firmware
-- 
cgit v1.2.3

