From 36a81eb9b98ac7b1dff0d6658dba0255dd579f5f Mon Sep 17 00:00:00 2001
From: Björn Stenberg <bjorn@haxx.se>
Date: Mon, 7 Dec 2009 09:17:48 +0000
Subject: Reverted r23881 mistakenly committed to branch.

git-svn-id: svn://svn.rockbox.org/rockbox/branches/v3_4@23882 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/sansaAMS_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/sansaAMS_install.tex')

diff --git a/manual/getting_started/sansaAMS_install.tex b/manual/getting_started/sansaAMS_install.tex
index 9e07c1b28a..9f2e25c64b 100644
--- a/manual/getting_started/sansaAMS_install.tex
+++ b/manual/getting_started/sansaAMS_install.tex
@@ -1,6 +1,6 @@
 % $Id: %
 
-In order to make your \archosplayertype{} load and execute the Rockbox
+In order to make your \playertype{} load and execute the Rockbox
 firmware you have just installed, you will need to install the
 Rockbox bootloader. Unless bugs are found in the bootloader code, or
 significant new features are added, you will only have to perform this
-- 
cgit v1.2.3

