From 72e9b610616f2969b100d501ab4f15ab5aecdd27 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Sat, 12 Dec 2020 23:08:16 -0500
Subject: manual:  Replace all rockbox.org urls with https.

In the process, utilize the \download{} and \wikilink{} commands instead
of direct URLs.

Change-Id: Iad38c15c7b9cec95b6c011fd0dbdbb3326985bbc
---
 manual/getting_started/mrobe100_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/mrobe100_install.tex')

diff --git a/manual/getting_started/mrobe100_install.tex b/manual/getting_started/mrobe100_install.tex
index 4c195e6248..9e141b1400 100644
--- a/manual/getting_started/mrobe100_install.tex
+++ b/manual/getting_started/mrobe100_install.tex
@@ -1,7 +1,7 @@
 \subsubsection{Installation}
 \begin{enumerate}
   \item Download 
-  {\url{http://download.rockbox.org/bootloader/olympus/mrobe100/pp5020.mi4}}
+  {\download{bootloader/olympus/mrobe100/pp5020.mi4}}
   \item Connect your \playertype{} to the computer.
   \item Rename the original \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \playertype{}.
     \warn{You should keep a safe backup of this file for use if you ever wish to switch back to the \playerman{} firmware.}
-- 
cgit v1.2.3

