From 5c7889fd4be76f26b04e84e38c5b12c38aee678c Mon Sep 17 00:00:00 2001
From: Linus Nielsen Feltzing <linus@haxx.se>
Date: Wed, 19 Mar 2008 07:30:46 +0000
Subject: A small clarification in the m:robe 100 installation instructions

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16713 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/mrobe100_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/mrobe100_install.tex')

diff --git a/manual/getting_started/mrobe100_install.tex b/manual/getting_started/mrobe100_install.tex
index 48da071d80..3379239924 100644
--- a/manual/getting_started/mrobe100_install.tex
+++ b/manual/getting_started/mrobe100_install.tex
@@ -3,7 +3,7 @@
   \item Download 
   \opt{mrobe100}{\url{http://download.rockbox.org/bootloader/olympus/mrobe100/pp5020.mi4}}
   \item Connect your \playertype{} to the computer.
-  \item Rename the \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \playertype{}.
+  \item Rename the original \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \playertype{}.
     \note{You should keep a safe backup of this file for use if you ever wish to switch back to the \playerman{} firmware.}
     \note{If you cannot see the \fname{System} directory, you will need to make sure your operating system is configured to show hidden files and directories.}
 
-- 
cgit v1.2.3

