From 4fe9d7c2cdec63b5fd498af3574d16b6b852e470 Mon Sep 17 00:00:00 2001
From: Robert Kukla <roolku@rockbox.org>
Date: Tue, 4 Mar 2008 10:46:51 +0000
Subject: mrobe 100 manual - installation section

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16510 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/mrobe100_install.tex | 11 +++++++++++
 1 file changed, 11 insertions(+)
 create mode 100644 manual/getting_started/mrobe100_install.tex

(limited to 'manual/getting_started/mrobe100_install.tex')

diff --git a/manual/getting_started/mrobe100_install.tex b/manual/getting_started/mrobe100_install.tex
new file mode 100644
index 0000000000..48da071d80
--- /dev/null
+++ b/manual/getting_started/mrobe100_install.tex
@@ -0,0 +1,11 @@
+\subsubsection{Installation}
+\begin{enumerate}
+  \item Download 
+  \opt{mrobe100}{\url{http://download.rockbox.org/bootloader/olympus/mrobe100/pp5020.mi4}}
+  \item Connect your \playertype{} to the computer.
+  \item Rename the \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \playertype{}.
+    \note{You should keep a safe backup of this file for use if you ever wish to switch back to the \playerman{} firmware.}
+    \note{If you cannot see the \fname{System} directory, you will need to make sure your operating system is configured to show hidden files and directories.}
+
+  \item Copy the \fname{pp5020.mi4} file you downloaded to the System directory on your \dap{}.
+\end{enumerate}
-- 
cgit v1.2.3

