From 36a81eb9b98ac7b1dff0d6658dba0255dd579f5f Mon Sep 17 00:00:00 2001
From: Björn Stenberg <bjorn@haxx.se>
Date: Mon, 7 Dec 2009 09:17:48 +0000
Subject: Reverted r23881 mistakenly committed to branch.

git-svn-id: svn://svn.rockbox.org/rockbox/branches/v3_4@23882 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/mrobe100_install.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/getting_started/mrobe100_install.tex')

diff --git a/manual/getting_started/mrobe100_install.tex b/manual/getting_started/mrobe100_install.tex
index 0ddc966c4a..41fafac073 100644
--- a/manual/getting_started/mrobe100_install.tex
+++ b/manual/getting_started/mrobe100_install.tex
@@ -2,9 +2,9 @@
 \begin{enumerate}
   \item Download 
   {\url{http://download.rockbox.org/bootloader/olympus/mrobe100/pp5020.mi4}}
-  \item Connect your \archosplayertype{} to the computer.
-  \item Rename the original \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \archosplayertype{}.
-    \warn{You should keep a safe backup of this file for use if you ever wish to switch back to the \archosplayerman{} firmware.}
+  \item Connect your \playertype{} to the computer.
+  \item Rename the original \fname{pp5020.mi4} file to \fname{OF.mi4} in the \fname{System} directory on your \playertype{}.
+    \warn{You should keep a safe backup of this file for use if you ever wish to switch back to the \playerman{} firmware.}
     \note{If you cannot see the \fname{System} directory, you will need to make sure your operating system is configured to show hidden files and directories.}
 
   \item Copy the \fname{pp5020.mi4} file you downloaded to the System directory on your \dap{}.
-- 
cgit v1.2.3

