From ca673d7e9fe2cf06fa9cabf026354a2ba0e73c6f Mon Sep 17 00:00:00 2001
From: Franklin Wei <franklin@rockbox.org>
Date: Sun, 28 Jun 2020 00:08:42 -0400
Subject: Partially revert the last commit.

The \if->\If replacement is a bit premature for texlive-2019, apparently.

Change-Id: Iab198c2f5e2f00ecdf7e2431e2b77c423e6afc07
---
 manual/getting_started/main.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/getting_started/main.tex')

diff --git a/manual/getting_started/main.tex b/manual/getting_started/main.tex
index 4d1798a4c7..f5eba1fae8 100644
--- a/manual/getting_started/main.tex
+++ b/manual/getting_started/main.tex
@@ -65,7 +65,7 @@ unsupported''. Manufacturer and model names are proper nouns, and
 thus are written beginning with a capital letter.
 
 % write a bit more about names etc. here.
-\Ifpdfoutput{
+\ifpdfoutput{
 This manual has some parts that are marked with icons on the margin to help
 you finding important parts or parts you could skip. The following icons
 are used:
@@ -91,14 +91,14 @@ are used:
   icon shown in the margin on the right.
 \\
 }
-}{}% end Ifpdfoutput
+}{}% end ifpdfoutput
 
 Links to the wiki are abbreviated by the name of the wiki page. Those names
 are still linked so you can simply follow them like any other link in this
 manual. If you want to access a wiki page manually go to
 \wikiicon{} \href{\wikibaseurl}{\wikibaseurl}
 and type the page name in the ``Go'' box at the top of the page.
-\Ifpdfoutput{Links to wiki pages are also indicated by the symbol \wikiicon{}
+\ifpdfoutput{Links to wiki pages are also indicated by the symbol \wikiicon{}
 in front of the page name.}{}
 
 \input{getting_started/installation.tex}
-- 
cgit v1.2.3

