From 953411fddc0139b2a88fb54651c2c0e6c993f2a6 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Thu, 20 Apr 2006 18:54:13 +0000
Subject: Remove the choice table for archos, it's useless since device
 specific manuals. Leave the file alone for now to reuse it later in an
 all-devices table.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9745 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/main.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/main.tex')

diff --git a/manual/getting_started/main.tex b/manual/getting_started/main.tex
index 96f8a389a7..4b36a061c7 100644
--- a/manual/getting_started/main.tex
+++ b/manual/getting_started/main.tex
@@ -1,3 +1,4 @@
+% $Id$ %
 \chapter{Getting started}
 \section{Welcome}
 This is the manual for Rockbox. Rockbox is an open source firmware replacement
@@ -31,7 +32,6 @@ software. There is, however, more help available.  The Rockbox website at
 written by members of the Rockbox community and this should be your first port
 of call when looking for further help.
 
-\opt{player,recorder,recorderv2fm,ondio}{\input{getting_started/archos_choice}}
 \opt{h1xx,h300}{\input{getting_started/iriver_install}}
 
 \section{Downloading Rockbox}
-- 
cgit v1.2.3

