From 1f9cb42e27411dc28e0d2d390ebe61a24afbd52d Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Fri, 15 Aug 2008 21:59:36 +0000
Subject: Make the wiki base url show up correctly in the html output.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@18292 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/main.tex | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'manual/getting_started/main.tex')

diff --git a/manual/getting_started/main.tex b/manual/getting_started/main.tex
index b41f987829..9b68312723 100644
--- a/manual/getting_started/main.tex
+++ b/manual/getting_started/main.tex
@@ -94,9 +94,10 @@ are used:
 
 Links to the wiki are abbreviated by the name of the wiki page. Those names
 are still linked so you can simply follow them like any other link in this
-manual. If you want to access a wiki page manually go to \url{\wikibaseurl}
+manual. If you want to access a wiki page manually go to
+\wikiicon{} \href{\wikibaseurl}{\wikibaseurl}
 and type the page name in the ``Go'' box at the top of the page.
-\ifpdfoutput{Links to wiki pages are also indicated by the symbol \wikiicon
+\ifpdfoutput{Links to wiki pages are also indicated by the symbol \wikiicon{}
 in front of the page name.}{}
 
 \input{getting_started/installation.tex}
-- 
cgit v1.2.3

