From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/iriver_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/iriver_install.tex')

diff --git a/manual/getting_started/iriver_install.tex b/manual/getting_started/iriver_install.tex
index de3c8c0552..f1ee1b69e2 100644
--- a/manual/getting_started/iriver_install.tex
+++ b/manual/getting_started/iriver_install.tex
@@ -96,7 +96,7 @@
   damaged). The screen will simply display the text ``bootloader USB mode''.
   After you disconnect the \dap{} from USB the bootloader will
   continue booting Rockbox. As in bootloader USB mode the firmware
-  itself hasn't been loaded this is also a simple way of updating Rockbox.
+  itself has not been loaded this is also a simple way of updating Rockbox.
   After the disconnect the bootloader will load the updated version of
   Rockbox.
 }
-- 
cgit v1.2.3

