From 72e9b610616f2969b100d501ab4f15ab5aecdd27 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Sat, 12 Dec 2020 23:08:16 -0500
Subject: manual:  Replace all rockbox.org urls with https.

In the process, utilize the \download{} and \wikilink{} commands instead
of direct URLs.

Change-Id: Iad38c15c7b9cec95b6c011fd0dbdbb3326985bbc
---
 manual/getting_started/iriver_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/iriver_install.tex')

diff --git a/manual/getting_started/iriver_install.tex b/manual/getting_started/iriver_install.tex
index fbc53fec37..26dc845d1c 100644
--- a/manual/getting_started/iriver_install.tex
+++ b/manual/getting_started/iriver_install.tex
@@ -8,7 +8,7 @@
 
 \begin{enumerate}
   \item Download the firmware patcher \fname{fwpatcher.exe} from 
-  \url{http://download.rockbox.org/bootloader/iriver/} and save it to your desktop.
+  \download{bootloader/iriver/} and save it to your desktop.
     \note{The firmware patcher contains Unicode support, which is not supported by 
     all versions of Windows. If you have difficulty with the firmware patcher, try 
     downloading the alternate firmware patcher \fname{fwpatchernu.exe}, which is 
-- 
cgit v1.2.3

