From 6e8ec6f49b239bc8a8309c0f43c0e9cc9320cc80 Mon Sep 17 00:00:00 2001
From: Peter D'Hoye <peter.dhoye@gmail.com>
Date: Sun, 30 Mar 2008 11:01:31 +0000
Subject: Iriver manual install: point to correct wiki page that contains links
 to iriver original firmwares. Seems most links are dead anyway, but the
 mirror of rasher is fine ;)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16891 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/iriver_install.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/getting_started/iriver_install.tex')

diff --git a/manual/getting_started/iriver_install.tex b/manual/getting_started/iriver_install.tex
index f1ee1b69e2..97b43db776 100644
--- a/manual/getting_started/iriver_install.tex
+++ b/manual/getting_started/iriver_install.tex
@@ -11,8 +11,8 @@
 
 \begin{enumerate}
   \item Download a supported version of the Iriver firmware for your 
-  \playername{} from the Iriver website or from 
-  \wikilink{ManualRockboxInstall}.
+  \playername{} from the Iriver website, links can be found on 
+  \wikilink{IriverBoot}.
   Supported Iriver firmware versions currently include 
   \opt{IRIVER_H100_PAD}{1.63US, 1.63EU, 1.63K, 1.65US, 1.65EU, 1.65K, 1.66US, 
     1.66EU and 1.66K.  Note that the H140 uses the same firmware as the H120;
-- 
cgit v1.2.3

