From ed40d3a65e302807c153c642c9bac325bcedd15a Mon Sep 17 00:00:00 2001
From: Dave Chapman <dave@dchapman.com>
Date: Sat, 10 Mar 2007 08:37:37 +0000
Subject: Make link to firmware installation section go directly to 2.2.2, not
 to 2.2

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@12701 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index ae034a6402..6223b998fb 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -138,7 +138,7 @@ software.
 
   \end{description}
 
-  \subsection{Installing the firmware}
+  \subsection{Installing the firmware}\label{sec:installing_firmware}
 }
 
 There are three different types of firmware binaries from Rockbox website:
-- 
cgit v1.2.3

