From d6eefbb21959f690d2da703a7ca421ac5be9c5fa Mon Sep 17 00:00:00 2001
From: Franklin Wei <git@fwei.tk>
Date: Mon, 17 Apr 2017 17:30:42 -0400
Subject: manual: typo fixes

Change-Id: I4a86e031c2dccd2a60b6d0d3fd7cca5df1d88774
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 857aa503c9..da138e2067 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -586,7 +586,7 @@ structure that Rockbox needs.\\}
     Interrupting the next step due to a power failure most likely
     will brick your \dap{}.
   }
-  \note{If you are updating/reinstalling the bootloader on a previouslsy
+  \note{If you are updating/reinstalling the bootloader on a previously
     rockbox installed bootloader you will need to boot into the original
     firmware in order to perform the following step. See \reference{ref:Dualboot}
     for details on how to do so
-- 
cgit v1.2.3

