From a232b1a98de719c3d3093141e928d37d30b9b574 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Tue, 22 Oct 2024 21:10:02 -0400
Subject: manual:  Correct typo in ipod6g-specific doumentation

Change-Id: I520a95a38dfc902c6694a4e9f3c8a641b675045d
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index c5a5cf37de..1b09ce1f22 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -274,7 +274,7 @@ of before installing.
 Rockbox supports very large drive capacities when used with GPT partitioning on devices that utilize ATA storage, but due to the limitations of the FAT32 filesystem, individual paritions cannot exceed 2TiB. Additionally, there may be underlying platform limitations that make it difficult, if not impossible, utilize a drive larger than some arbitrary size or boot from a drive using GPT partitioning.
 
 \opt{ipod6g}{
-For example, the stock Apple firmware on earlier 6th generation iPod Classic models\footnote{MB029, MB145, MB147, MB150} is limited to drives no larger than 128GiB, and booting into the Apple firmware firmware with larger drive sizes will result in massive data corruption.  Later 6th generation iPod Classic models\footnote{MB562, MB565, MC293, MC297} (sometimes referred to as ``7th gen'') do not have this issue.  Rockbox itself will function correctly on all 6th/7th generation iPod Classi models.
+For example, the stock Apple firmware on earlier 6th generation iPod Classic models\footnote{MB029, MB145, MB147, MB150} is limited to drives no larger than 128GiB, and booting into the Apple firmware firmware with larger drive sizes will result in massive data corruption.  Later 6th generation iPod Classic models\footnote{MB562, MB565, MC293, MC297} (sometimes referred to as ``7th gen'') do not have this issue.  Rockbox itself will function correctly on all 6th/7th generation iPod Classic models.
 }
 
 \note{In practice, no Rockbox-capable device can currently handle total drive capacities exceeding 2TiB.}
-- 
cgit v1.2.3

