From 6162d813e7bf29d53d040547dc6fd826ca0270df Mon Sep 17 00:00:00 2001
From: Rafaël Carré <funman@videolan.org>
Date: Sat, 11 Feb 2012 14:13:26 -0500
Subject: Sansa AMS: don't duplicate incorrectly install steps.

Change-Id: Ib9678ca108cc1264d5dc355fabc5ba877da59497
---
 manual/getting_started/installation.tex | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 855a8a8c67..c3f7ab0daf 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -532,10 +532,15 @@ structure that Rockbox needs.\\}
   \end{itemize}
 }
 
-\opt{iriverh10,iriverh10_5gb,ipod,mrobe100,sansa,archos,sansaAMS,cowond2,vibe500,ondavx777}{
+\opt{iriverh10,iriverh10_5gb,ipod,mrobe100,sansa,archos,cowond2,vibe500,ondavx777}{
   Safely eject / unmount the USB drive, unplug the cable and restart.
 }
 
+\opt{sansaAMS}{
+  Safely eject the device, unplug USB and wait for the firmware update to finish.
+  Don't try to power off the device, it will shutdown by itself after a minute.
+}
+
 \opt{gigabeats}{
   Safely eject / unmount your \dap{}.
 }
-- 
cgit v1.2.3

