From 5dfcadc45bdecd2d5f075e9792e0c7ca65f9bb5f Mon Sep 17 00:00:00 2001
From: Sebastian Leonhardt <sebastian.leonhardt@web.de>
Date: Tue, 31 Jul 2018 12:10:29 +0200
Subject: manual: nitpicking on '-' character and other minor details

Change-Id: Id204276387d55ba2276530ed1cb6ee827e28062a
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 64364fccb2..473fca2bb9 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -456,7 +456,7 @@ straight to \reference{ref:finish_install}
 \subsubsection{Installing the firmware}\label{sec:installing_firmware}
 
 \opt{gigabeats}{\note{When your \dap{} is in the Rockbox USB or bootloader
-USB mode, you will see two visible partitions - the 150~MB firmware
+USB mode, you will see two visible partitions -- the 150~MB firmware
 partition (containing at least a file called \fname{nk.bin}) and
 the main data partition. Rockbox \emph{must} be installed onto the main
 data partition.}}
-- 
cgit v1.2.3

