From 5a379bce60b22f0a5d469ec5b4d03e7089f49316 Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Thu, 20 May 2010 16:35:45 +0000
Subject: Another strike against ugly apostrophes in the manual

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26199 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 8a07986aa7..9e6b6feaa7 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -139,7 +139,7 @@ follow the instructions at
   }
   \opt{x5}{
     When instructed to connect/disconnect the USB cable, always use
-    the USB port through the subpack, not the side 'USB Host' port. The side port
+    the USB port through the subpack, not the side `USB Host' port. The side port
     is intended to be used for USB OTG connections only (digital cameras, memory
     sticks, etc.).
   }
-- 
cgit v1.2.3

