From 394b579c4d83825fd9dd63c3b1cf01b51297c1da Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Sat, 13 Mar 2010 10:50:39 +0000
Subject: Add a note to the gigabeat F manual to be in the correct USB mode
 before installing.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25142 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 7 +++++--
 1 file changed, 5 insertions(+), 2 deletions(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index c481a6fde3..84d29d9e71 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -167,8 +167,11 @@ follow the instructions at
       \note{Once Rockbox has been installed, when you shut down your \dap{} from Rockbox it will totally
        power the player off so step 1 is no longer necessary.}
   }
-  \opt{gigabeatf}{During installation, do not connect your \dap{}
-  using the cradle but plug the USB cable directly to the \dap{}.
+  \opt{gigabeatf}{The installation requires you to change a setting in the
+      original firmware.  Make sure the option under \setting{Setup
+      $\rightarrow$ Connections $\rightarrow$ PC Connections} is set to 
+      \setting{gigabeat room}. Also, during installation, do not connect your
+      \dap{} using the cradle but plug the USB cable directly to the \dap{}.
   } 
 \end{description}
 }
-- 
cgit v1.2.3

