From 1f07151110ed32bf3f443b9c509bec463c50412d Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Sat, 20 Jun 2009 22:44:36 +0000
Subject: Remove the 'hand-made' MASCODEC UseOption from the platform files and
 replace it with other options which automatically parsed from features.txt.
 Also clean up some outdated left-overs and add some missing information (e.g.
 be more accurate in the config file section). Try to use the most appropriate
 features - masd and/or masf depending on their characteristics,
 large_plugin_buffer in the jpegviewer chapter as this is the restricting
 factor etc.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@21426 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 8 +++++---
 1 file changed, 5 insertions(+), 3 deletions(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 337ed5825a..db356c12fc 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -146,7 +146,7 @@ still available to you.\\
   various important aspects of Rockbox, such as the different versions
   available.\\}}
 
-\opt{MASCODEC}{Rockbox itself comes as a single package. There is no need
+\opt{hwcodec}{Rockbox itself comes as a single package. There is no need
   to install additional software to run Rockbox.}
 \opt{swcodec} {
   \opt{HAVE_RB_BL_ON_DISK}{There are three separate components,
@@ -495,8 +495,10 @@ The new build will be installed over your current build.\\
   data partiton.\\}
 }
 
-The bootloader only changes rarely, and should not normally
-need to be updated.\\
+\nopt{hwcodec}{
+  The bootloader only changes rarely, and should not normally
+  need to be updated.\\
+}
 
 \note{If you use Rockbox Utility be aware that it cannot detect manually
         installed components.}
-- 
cgit v1.2.3

