From 16f8f3409b2935c5191096bb567ea882df26f847 Mon Sep 17 00:00:00 2001
From: Bertrik Sikken <bertrik@sikken.nl>
Date: Mon, 11 Apr 2011 20:58:19 +0000
Subject: Fix various minor spelling issues in the manual.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@29704 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/installation.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/installation.tex')

diff --git a/manual/getting_started/installation.tex b/manual/getting_started/installation.tex
index 10d13b6e12..575cd2d58f 100644
--- a/manual/getting_started/installation.tex
+++ b/manual/getting_started/installation.tex
@@ -560,7 +560,7 @@ structure that Rockbox needs.\\}
   or that it is connected to the power adaptor. Interrupting the next step
   due to a power failure most likely will brick your \dap{}.}
   Update your \daps{} firmware with the patched bootloader. To do this, turn
-  the jukebox on. The update process should start automaticaly. The \playerman{} will
+  the jukebox on. The update process should start automatically. The \playerman{} will
   display animation indicating that the firmware update is in progress. Do \emph{not}
   interrupt this process. When the firmware update is complete the player will restart.
   (The update firmware process usually takes a minute or so.). You are now ready to go.
-- 
cgit v1.2.3

