From 72e9b610616f2969b100d501ab4f15ab5aecdd27 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Sat, 12 Dec 2020 23:08:16 -0500
Subject: manual:  Replace all rockbox.org urls with https.

In the process, utilize the \download{} and \wikilink{} commands instead
of direct URLs.

Change-Id: Iad38c15c7b9cec95b6c011fd0dbdbb3326985bbc
---
 manual/getting_started/gigabeat_install.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/getting_started/gigabeat_install.tex')

diff --git a/manual/getting_started/gigabeat_install.tex b/manual/getting_started/gigabeat_install.tex
index c248527c20..6519676256 100644
--- a/manual/getting_started/gigabeat_install.tex
+++ b/manual/getting_started/gigabeat_install.tex
@@ -2,7 +2,7 @@
 
 \begin{itemize}
 \item Download the Rockbox bootloader from
-  \url{http://download.rockbox.org/bootloader/gigabeat/}
+  \download{bootloader/gigabeat/}
 \item Starting at the root directory of your player browse into the directory
   \fname{GBSYSTEM} and from that into the subdirectory \fname{FWIMG}.
   These directories are hidden. Make sure that you have configured your browser
@@ -14,4 +14,4 @@
   without a copy of the original firmware from the original install CD.}
 \item Now copy the file \fname{FWIMG01.DAT} you downloaded to that directory.
   Make sure the spelling is correct.
-\end{itemize}
\ No newline at end of file
+\end{itemize}
-- 
cgit v1.2.3

