From 36a81eb9b98ac7b1dff0d6658dba0255dd579f5f Mon Sep 17 00:00:00 2001
From: Björn Stenberg <bjorn@haxx.se>
Date: Mon, 7 Dec 2009 09:17:48 +0000
Subject: Reverted r23881 mistakenly committed to branch.

git-svn-id: svn://svn.rockbox.org/rockbox/branches/v3_4@23882 a1c6a512-1295-4272-9138-f99709370657
---
 manual/getting_started/gigabeat_install.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/getting_started/gigabeat_install.tex')

diff --git a/manual/getting_started/gigabeat_install.tex b/manual/getting_started/gigabeat_install.tex
index 9929449340..c248527c20 100644
--- a/manual/getting_started/gigabeat_install.tex
+++ b/manual/getting_started/gigabeat_install.tex
@@ -9,7 +9,7 @@
   to show hidden files or you may be unable to see \fname{FWIMG}.
 \item In that directory you'll find a file called \fname{FWIMG01.DAT}. This too
   may be hidden. Rename the file to \fname{FWIMG01.DAT.ORIG}. Make sure you
-  spelled that name  correctly as it is needed for booting the \archosplayerman{} firmware.
+  spelled that name  correctly as it is needed for booting the \playerman{} firmware.
   \warn{If you do not complete this step then you will be unable to uninstall Rockbox
   without a copy of the original firmware from the original install CD.}
 \item Now copy the file \fname{FWIMG01.DAT} you downloaded to that directory.
-- 
cgit v1.2.3

