From ca673d7e9fe2cf06fa9cabf026354a2ba0e73c6f Mon Sep 17 00:00:00 2001
From: Franklin Wei <franklin@rockbox.org>
Date: Sun, 28 Jun 2020 00:08:42 -0400
Subject: Partially revert the last commit.

The \if->\If replacement is a bit premature for texlive-2019, apparently.

Change-Id: Iab198c2f5e2f00ecdf7e2431e2b77c423e6afc07
---
 manual/frontpage/frontpage.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/frontpage/frontpage.tex')

diff --git a/manual/frontpage/frontpage.tex b/manual/frontpage/frontpage.tex
index d343d4cf0c..1b451d5cbb 100644
--- a/manual/frontpage/frontpage.tex
+++ b/manual/frontpage/frontpage.tex
@@ -1,7 +1,7 @@
 \thispagestyle{empty}
 \vspace*{0.3cm}
 \begin{center}
-\Ifpdfoutput{\includegraphics[width=10cm]{frontpage/rockboxlogo.pdf}}
+\ifpdfoutput{\includegraphics[width=10cm]{frontpage/rockboxlogo.pdf}}
 {\includegraphics{frontpage/rockbox-web.png}}\\
 \vspace{2cm}
 \huge{\textsf{\textbf{The Rockbox Manual\\for\\\playername}}}\vspace{1cm}\\
-- 
cgit v1.2.3

