From e312101181c2b4a4bd610e4f4e8a1f9a9f576323 Mon Sep 17 00:00:00 2001
From: Benjamin Brown <foolsh.person@gmail.com>
Date: Fri, 29 Aug 2014 04:50:22 -0400
Subject: Add touchpad deadzone entry in Rockbox manual

Change-Id: I227ba30628343db15e46e0250ba62e024d5b7ba1
Reviewed-on: http://gerrit.rockbox.org/939
Reviewed-by: Amaury Pouly <amaury.pouly@gmail.com>
---
 manual/configure_rockbox/system_options.tex | 11 +++++++++++
 1 file changed, 11 insertions(+)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 2b5404a80a..23816e7809 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -227,8 +227,19 @@ therefore result in better runtime.
       on the touchpad.
     }
     \end{description}
+    \begin{description}
+    \opt{touchpad_deadzone}{
+      \item [Touchpad Deadzone. ]This setting controls the size of a configurable deadzone
+      where touch events between virtual keys are ignored.  If set to \opt{SANSA_FUZEPLUS_PAD}
+      {\setting{0}} there is effectivly no deadzone. If set to \opt{SANSA_FUZEPLUS_PAD}
+      {\setting{100}} the deadzones between each virtual button are set to a maximuim
+      400px.
+    }
+    \end{description}
 }
 
+
+
 \opt{usb_hid}{
   \subsection{\label{ref:USB_HID}USB HID}
     This option turns the USB HID feature \setting{On} and \setting{Off}.
-- 
cgit v1.2.3

