From dfc6093342736a1655269b635f306d8ddecccd81 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Thu, 6 Dec 2007 20:05:38 +0000
Subject: Fix missing whitespace and correct upper limit of entries in playlist

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@15887 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/system_options.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 62665ed2da..38f446be2e 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -8,7 +8,7 @@
     screen it was when the \dap{} was shut off.
 
 \subsection{Battery}
-    Options relating to the \opt{archos}{batteries}\nopt{archos}{battery}%
+    Options relating to the \opt{archos}{batteries}\nopt{archos}{battery}
     in the \dap.
   \begin{description}
     \item [Battery Capacity: ]This setting can be used to tell Rockbox what
@@ -111,7 +111,7 @@ This sub menu relates to limits in the Rockbox operating system.
     directories with a large number of files.
 
     \item [Max playlist size: ]This setting controls the maximum size of 
-    a playlist. The playlist size can be between 1,000 and 20,000 files,
+    a playlist. The playlist size can be between 1,000 and 32,000 files,
     in steps of 1,000 (default is 10,000). Higher values will shorten the
     music buffer, so you should increase this setting \emph{only} if you
     have very large playlists.
-- 
cgit v1.2.3

