From dd5e3eb5424a66a5399f99386b59a8ee86d6cde0 Mon Sep 17 00:00:00 2001
From: Frank Gevaerts <frank@gevaerts.be>
Date: Sun, 29 Aug 2010 21:19:12 +0000
Subject: Change dap{} to \dap{} in the iaudio battery capacity description

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@27943 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/system_options.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 62825bdb3f..c9e526ae1d 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -54,7 +54,7 @@
         runtime estimation as shown on screen.
       \opt{iaudiom3,iaudiom5,iaudiox5}{Rockbox does not automatically distinguish
         between the ``L'' models and the ``simple'' models which determine the
-        default value. If your dap{} is an
+        default value. If your \dap{} is an
             \opt{iaudiom3}{M3L}%
             \opt{iaudiom5}{M5L}%
             \opt{iaudiox5}{X5L}
-- 
cgit v1.2.3

