From d89f400c21a129a3daee8b1541d8f97c74f629fa Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Tue, 12 Aug 2008 15:39:47 +0000
Subject: Use the generated feature to control inclusion of sections about
 different battery types, add 'battery type' to config file options

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@18255 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/system_options.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 44a4c7e646..7282ea32ba 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -37,7 +37,7 @@
         family at present, and work is on-going into finding a better way to
         determine battery life.}
 
-      \opt{BATTERY_TYPES}{%Ondios only (currently), following the lang features.txt
+      \opt{battery_types}{
       \item [Battery Type: ]This setting tells Rockbox which type of battery
         is currently used in the \dap{}. The two supported battery types are
         ``Alkaline'' or ``NiMH''.}
-- 
cgit v1.2.3

