From b659c0c14cbe89cd7602a847e90058e4f39b7fc3 Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sat, 22 Mar 2008 15:26:45 +0000
Subject: FS#8740 by Marc Guay correct option names since the changes to
 english.lang, add some missing menu items, small tweaks by me. I also added
 descriptions for 'Say File Type' and 'Announce Battery Level'.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16747 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/system_options.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index cfecf36c76..4a75f22fe1 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -122,14 +122,14 @@ available.
 \subsection{Limits}
 This sub menu relates to limits in the Rockbox operating system.
   \begin{description}
-    \item [Max files in dir browser: ]This setting controls the limit on
+    \item [Max Entries in File Browser: ]This setting controls the limit on
     the number of files that you can put in any particular directory in the
     file browser. You can configure the size to be between 50 and
     10,000 files in steps of 50. The default is 400. Higher values will shorten
     the music buffer, so you should increase this setting \emph{only} if you have
     directories with a large number of files.
 
-    \item [Max playlist size: ]This setting controls the maximum size of
+    \item [Max Playlist Size: ]This setting controls the maximum size of
     a playlist. The playlist size can be between 1,000 and 32,000 files,
     in steps of 1,000 (default is 10,000). Higher values will shorten the
     music buffer, so you should increase this setting \emph{only} if you
-- 
cgit v1.2.3

