From 93afea0cd05862ac0b573a7abd471eefc1291463 Mon Sep 17 00:00:00 2001
From: Tomer Shalev <shalev.tomer@gmail.com>
Date: Tue, 15 Dec 2009 19:56:03 +0000
Subject: Cowon D2 manual: Platform specific information and installation
 instructions

FS#10735 - Platform files for Cowon D2 manual
Author: Aleksei Kaveshnikov (4nykey)

I've modified the original patch to comply with current state of both the
player and manual.


git-svn-id: svn://svn.rockbox.org/rockbox/trunk@24008 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/system_options.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index bc513aa07f..e7f70b8f0f 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -29,6 +29,7 @@
       \opt{m5,x5}{950mAh}%
       \opt{gigabeatf}{2000mAh}%
       \opt{gigabeats}{700mAh}%
+      \opt{cowond2}{1600mAh}%
       , which is the capacity value for the standard
       \opt{archos}{batteries}\nopt{archos}{battery} shipped with the \dap.
         Rockbox uses this value for runtime estimation, not battery percentage
-- 
cgit v1.2.3

