From 82e26ff2e443fec8afaeaa3f5f809f223717c835 Mon Sep 17 00:00:00 2001
From: Aidan MacDonald <amachronic@protonmail.com>
Date: Sun, 22 Jan 2023 22:10:02 +0000
Subject: Fix manuals 5b27e2255a

Some targets don't have \ButtonVolUp and \ButtonVolDown so reword
to avoid using them.

Change-Id: I5353d85e579f51e07555e1048b40d90bffa9ae90
---
 manual/configure_rockbox/system_options.tex | 5 ++---
 1 file changed, 2 insertions(+), 3 deletions(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index d4a282b445..84039eee03 100755
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -139,9 +139,8 @@ This sub menu relates to limits in the Rockbox operating system.
   }
 \opt{perceptual_volume}{
   \subsection{Volume Adjustment Mode}
-  This setting selects the method used to adjust volume with \ButtonVolUp{} and
-  \ButtonVolDown{}. In \setting{Direct} mode each volume step changes the volume
-  by a fixed number of decibels (dB).
+  This setting selects the method used to adjust volume. In \setting{Direct}
+  mode each volume step changes the volume by a fixed number of decibels (dB).
 
   In \setting{Perceptual} mode, the hardware volume range is divided into a
   number of steps, controlled by the \setting{Number of Volume Steps} option.
-- 
cgit v1.2.3

