From 43f1ac8510596f217c662218523e0a101dee224c Mon Sep 17 00:00:00 2001
From: Benjamin Brown <foolsh.person@gmail.com>
Date: Mon, 2 Dec 2013 16:02:07 -0500
Subject: Docs: Manual entry for touchpad settings.

New section Touchpad added to the manual. Gigabeatfx and
SansaFuze+ entries added for touchpad sensitivity setting.

Change-Id: I0c5a173d6ad479c4e6995cf5045d90da6cc216ab
Reviewed-on: http://gerrit.rockbox.org/689
Reviewed-by: Benjamin Brown <foolshperson@gmail.com>
Tested: Benjamin Brown <foolshperson@gmail.com>
Reviewed-by: Michael Giacomelli <giac2000@hotmail.com>
---
 manual/configure_rockbox/system_options.tex | 14 ++++++++++++++
 1 file changed, 14 insertions(+)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 167ffa74d0..30a3237453 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -215,6 +215,20 @@ therefore result in better runtime.
     \end{description}
 }
 
+\opt{touchpad}{
+  \subsection{Touchpad}
+    These settings control the functions of touchpad devices.
+    \begin{description}
+    \opt{SANSA_FUZEPLUS_PAD,GIGABEAT_PAD}{
+      \item [Touchpad Senstivity. ]This setting controls the amount of pressure needed to
+      register a touchpad press. If set to \opt{SANSA_FUZEPLUS_PAD}{\setting{25}}\opt{GIGABEAT_PAD}
+      {\setting{High}} the lightest touch will register. If set to \opt{SANSA_FUZEPLUS_PAD}
+      {\setting{-25}}\opt{GIGABEAT_PAD}{\setting{Normal}} a firmer press will be needed to register
+      on the touchpad.
+    }
+    \end{description}
+}
+
 \opt{usb_hid}{
   \subsection{\label{ref:USB_HID}USB HID}
     This option turns the USB HID feature \setting{On} and \setting{Off}.
-- 
cgit v1.2.3

