From 0ff739cc6f6a968997ea159db9f08ba15ebe8406 Mon Sep 17 00:00:00 2001
From: Benjamin Brown <foolsh.person@gmail.com>
Date: Mon, 8 Sep 2014 15:47:54 -0400
Subject: Fix typo in fuze+ deadzone manual entry

Change-Id: I789a839941fa765e27fc91abcd5b395ab2df1316
Reviewed-on: http://gerrit.rockbox.org/952
Reviewed-by: Amaury Pouly <amaury.pouly@gmail.com>
---
 manual/configure_rockbox/system_options.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/system_options.tex')

diff --git a/manual/configure_rockbox/system_options.tex b/manual/configure_rockbox/system_options.tex
index 23816e7809..ca2504063e 100644
--- a/manual/configure_rockbox/system_options.tex
+++ b/manual/configure_rockbox/system_options.tex
@@ -231,7 +231,7 @@ therefore result in better runtime.
     \opt{touchpad_deadzone}{
       \item [Touchpad Deadzone. ]This setting controls the size of a configurable deadzone
       where touch events between virtual keys are ignored.  If set to \opt{SANSA_FUZEPLUS_PAD}
-      {\setting{0}} there is effectivly no deadzone. If set to \opt{SANSA_FUZEPLUS_PAD}
+      {\setting{0}} there is effectively no deadzone. If set to \opt{SANSA_FUZEPLUS_PAD}
       {\setting{100}} the deadzones between each virtual button are set to a maximuim
       400px.
     }
-- 
cgit v1.2.3

