From ed37c2e8948960b45c9bac58f1ffb678fdf31f5d Mon Sep 17 00:00:00 2001
From: William Wilgus <wilgus.william@gmail.com>
Date: Tue, 15 Mar 2022 17:12:40 -0400
Subject: FS#13193 - Add option to disable settings reset on startup

Updated version of the patch originally by user cockroach

UNTESTED
Ipods?, Iriver H10,
I do not own these players so YMMV

https://www.rockbox.org/tracker/task/13193

Change-Id: I7924837f582cc5c49ee68c186d6822f577f65147
---
 manual/configure_rockbox/startup_shutdown_options.tex | 13 +++++++++++++
 1 file changed, 13 insertions(+)

(limited to 'manual/configure_rockbox/startup_shutdown_options.tex')

diff --git a/manual/configure_rockbox/startup_shutdown_options.tex b/manual/configure_rockbox/startup_shutdown_options.tex
index 7952985ece..9bc85d6be8 100644
--- a/manual/configure_rockbox/startup_shutdown_options.tex
+++ b/manual/configure_rockbox/startup_shutdown_options.tex
@@ -36,6 +36,19 @@ are run at startup, or initiate a shutdown when conditions are met.
       to be enabled.
   \end{description}
 
+\opt{clear_settings_on_hold}{
+\subsection{\label{ref:ClearOnHold}Hold switch clears settings on startup }
+  This option controls whether Rockbox clears its configuration if the hold
+  switch is enabled during startup.
+
+  \begin{description}
+    \item[Yes.]
+          Clear the settings if the hold switch is enabled during startup.
+    \item[No.]
+          Do not clear the settings, regardless of the hold switch's position.
+    \end{description}
+}
+
 \subsection{\label{ref:IdlePoweroffSetting}Idle Poweroff}
   Rockbox can be configured to turn off power after the unit has been idle for
   a defined number of minutes. The \dap{} is idle when playback is stopped or
-- 
cgit v1.2.3

