From 5dba771d63b26195b24fc5bbd098aff733da2599 Mon Sep 17 00:00:00 2001
From: Nick Peskett <rockbox@peskett.co.uk>
Date: Mon, 26 Dec 2011 09:30:25 +0000
Subject: Option to restart running sleep timer on keypress.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@31437 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/startup_shutdown_options.tex | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'manual/configure_rockbox/startup_shutdown_options.tex')

diff --git a/manual/configure_rockbox/startup_shutdown_options.tex b/manual/configure_rockbox/startup_shutdown_options.tex
index 2fb4c4881a..ef84358af7 100644
--- a/manual/configure_rockbox/startup_shutdown_options.tex
+++ b/manual/configure_rockbox/startup_shutdown_options.tex
@@ -54,4 +54,7 @@ are run at startup, or initiate a shutdown when conditions are met.
     \item[Start Sleep Timer On Boot:]
       If set, a \setting{Sleep Timer} will be initiated when the device
       starts.
+    \item[Restart Sleep Timer On Keypress:]
+      If set, when a \setting{Sleep Timer} is active and a key is pressed, the
+      \setting{Sleep Timer} will be restarted with the initial duration.
   \end{description}
-- 
cgit v1.2.3

